The Cure for Every Disease, and Other Articles about Health and Healing.

by Frederick Hoehn, copyright 2013, All Rights Reserved

Table of Contents

The Cure For Every Disease

How to Cure Cancer

The Bump on the Back

Obesity Cured

Epilepsy Solved

Anger Management

It’s a Compulsion

What’s Wrong with this Picture?

Why Obamacare is Unconstitutional

The Cure for Every Disease

by Frederick Hoehn, www.FredHoehnMinistries.com

Just the other day, I posted an article, “How to Cure Cancer.”

More recently I had contact with a man who has a physical ailment that is not cancer.

So please let me explain something.  Although that article was titled, “How to Cure Cancer,” the same principles set forth in that article can be applied to any physical affliction, and emotional problems, and mental problems.

There is no affliction you could have that Jesus can’t fix, unless you’ve already gone down the wrong road so far that there’s just no keeping you out of hell.  Probably most people don’t fall into that category.

Perhaps you’ve been to lots of doctors.  Perhaps they’ve told you nothing can be done.  But here’s what those doctors forgot.  They forgot about Doctor Jesus.  I guess Jesus just wasn’t in those medical books that they studied in preparation for being a doctor.

How strange, in view of the fact that the top medical book in the world is the Holy Bible.  In fact, if people would spend more time in the Bible, they could avoid many problems in many areas of life.

But some people, when they read the Bible, apparently fail to put two and two together and get that if Jesus healed all those people in the Bible, He will heal them also, since, “God is no respecter of persons.” (Acts 10:34)  What he did for them, he’ll do for you.

God wants you to prosper and be in health as your soul prospers. (3 John 2)

God wants you to have life, and life more abundantly. (John 10:10)

Kenneth E. Hagin was born with an incurable heart disease that would have killed him before adulthood.  But Hagin found Mark 11:24, which says, “When you pray, believe that you receive the things you ask for, and you shall have them.  So that’s what Hagin did.

It took about sixteen months between the time Hagin started to believe God for his healing and the time he was healed, but the Lord healed his heart.  Then the Lord told Hagin, “Now go teach my people faith.”

So Hagin taught faith for like seventy years, and got lots of people healed, and he cast out many demons.

If you have anything wrong with your body, I recommend the books of Kenneth E. Hagin.  They’re available in some Christian book stores (look for the “Charismatic” section,) and at www.Rhema.org  (click on “bookstore”)

There is also a Kenneth W. Hagin, but I think I get more out of the books by Kenneth E. Hagin.

In Ephesians 4:11 we are told God gave us teachers.  Kenneth E. Hagin is one of those teachers.  And I am another of God’s teachers.

Another teacher on the subject of healing is Norvel Hayes.  He’s at www.nhm.cc

Another is Charles Capps.  He’s at www.CharlesCapps.com

How to Cure Cancer

by Frederick Hoehn, www.FredHoehnMinistries.com

Though I had the idea to write “How to Cure Cancer,” I was busy with another project, and didn’t intend to publish this just yet, but I felt the Lord wanted me to do it now.

Perhaps you or someone you know, maybe a family member, has cancer.  I am happy to announce that the cure for cancer has been found, and I will share my knowledge with you about this.

Knowledge that I’ve gained by being a student of some good teachers like Kenneth E. Hagin, Norvel Hayes, Charles Capps.

I’ll give you those three websites.  Kenneth E. Hagin, www.Rhema.org, Norvel Hayes,

www.nhm.cc, and Charles Capps,

www.CharlesCapps.com

Doctors have been trying to help cancer patients for many decades.  They know how to provide some relief, but they still keep losing patients.  In a moment, I’ll tell you about a doctor who is the doctor I use, and he has never lost a patient, if the patient co-operates and follows instructions.

When medical science studies a disease, they look for a physical cause.  The common cold is known to be caused by a virus.  I’m glad they found that out.  There are various bacteria that cause infections that can be seen with the aid of a microscope.

There are vitamin deficiency diseases like Scurvy.  British sailors got the name “limies” because the British Navy found that a daily dose of lime juice would prevent their sailors on British sailing ships from coming down with diseases caused by a deficiency of vitamin C.

It’s nice that we know as much as we do about medicine, and yet there’s much still not known about human diseases.

One of the main things medical science seems not to have grasped yet is that some diseases are caused by something you don’t find under the microscope.  There are a lot of diseases caused by demons.  And what exactly is a demon?  A demon is a fallen angel that rebelled against God when Satan rebelled against God.

Now I’m going to give you the cure for cancer, and how to get rid of the demons that cause cancer, but if you’re going to talk wrong, such as by saying, “There is no God,” then I don’t think I can do much for you.

The Bible says, “The fool has said in his heart there is no God.” (Psalm 14:1)  Don’t be a fool, and don’t talk like one.  Talking wrong can ruin you, as Charles Capps points out in his book, “God’s Creative Power Will Work for you,” which last time I checked was only $2.00.

It takes time and effort to learn to talk right, but you can accomplish that with God’s help.  The best textbook on the subject is The Holy Bible.

I’ve mostly used the King James Bible, but now there is “The Holy Bible, Hoehn Version,” copyright 2011, available as an ebook for the Kindle Reader devices at www.Amazon.com

Demons don’t like people.  One reason they don’t like people is that people can get “born again” (John chapter 3) and go to heaven.  But demons can’t go to heaven.  They will wind up in a fiery hell.  And demons want to take as many people as possible with them to hell.

In John 10:10, Jesus said, “The thief doesn’t come except to steal, to kill, and to destroy.”  And that’s what demons want to do to you and to your family and to everyone else.

Kenneth E. Hagin was ordained by God to be a teacher.  At one church where he was teaching, a woman was brought for healing from lung cancer.  She was so weak they had to bring her into the meeting in a bed.

Hagin had agreed with the pastor of the church to hold two weeks of meetings.  At that time in his ministry, he taught about every day, but he only prayed for the sick two days a week—Tuesdays and Fridays.

The woman was brought on the first Tuesday.  Hagin prayed for her healing, but though Hagin had prayed and healed lots of other people in his ministry, she didn’t get healed.

Same thing happened on Friday, and on Tuesday and Friday the following week, and Hagin had only been invited for two weeks.  Not looking so good for the lady with lung cancer.

But then the pastor asked Hagin to stay for another week, and he agreed to.

So the same woman was brought on the third Tuesday.  When Hagin went to pray for her, something different happened.  This time, God opened Hagin’s eyes to see into the spirit world.  There is the natural world that we see with our natural eyes.  We see other people.  We see cars.  We see our food.

But with our natural eyes we don’t normally see angels or demons because they don’t have flesh and blood bodies like people, they exist in a different dimension that is the spirit world.

But God opened Hagin’s eyes to see into the spirit world, and when God did that, Hagin saw a demon, Hagin called it an imp, at the area of the woman’s chest (she had lung cancer.)

When Hagin saw the demon, he commanded it to go from the woman.  The demon answered Hagin and said, “Well, I sure don’t want to go, but if you tell me to go, I know I have to go.”

Hagin told the demon not only to go from the woman, but to leave that church, and it went.

From that time on, the woman got stronger and stronger, recovered totally from the cancer, and lived a couple more decades.

You can have that too,  God is no respecter of persons, the Bible says.  What He’ll do for one person, He’ll do for you, if you’ll meet certain minimum qualifications.

Also, I have some other good news.  You don’t have to wait until God opens your eyes to see into the spirit world to cast out demons.  You only have to be a Christian.  In the book of Acts, the seven sons of Sceva tried to cast demons out of a man unsuccessfully, and got beaten up for their effort.  Why?  Because though they were Jews, they weren’t Messianic Jews, they weren’t Christians.

The authority of Christians to cast out demons comes from Jesus in Luke 10:19, “See, I give you power…over all the power of the enemy…”

We know from Ephesians chapter six that our main enemy is Satan and his demons (or, devils).  But in Luke 10:19, Jesus gives the Christians authority to cast out demons.  Also in Mark chapter 16.

So where does that leave you, friend?  You have authority to cast out demons if you’re a born-again Christian.  You don’t if you’re not.

But if you’re not yet a Christian, I have good news.  You can say yes to Jesus’ offer of salvation and become born again right now.

In Revelation 3:20, Jesus says, “See, I stand at the door and knock, if anyone hears my voice and opens the door, I’ll come in and eat with him, and he with me.”

Invite Jesus in and accept his free salvation.  Don’t put it off to some other day.  You might not have that other day.  You might not have tomorrow.

In Romans 10:9,10 we are told, “That if you confess with your mouth the Lord Jesus, and believe in your heart that God raised him from the dead, you’re saved.  For with the heart man believes for righteousness, and with the mouth, confession is made for salvation.”

If you’ll read Matthew, Mark, Luke, and John in the Bible, you’ll see where they crucified Jesus, he died, and on the third day God raised him from the dead.  He now sits at the right hand of God in heaven.

Now say out loud with your mouth, “I take you, Lord Jesus, as my savior, and I believe God raised you from the dead.”

Now if you’re still with me, probably you’re a Christian.  Of course, if you’re not a Christian, you can still finish reading the article, but it’s about curing cancer, and this cure only works for Christians, since unbelievers don’t have authority over demons.

Earlier in this article, I said I’d tell you about my doctor.  He is Doctor Jesus, King of Kings, and Lord of Lords, the Lily of the Valley, the Bright and Morning Star, the Fairest of Ten Thousand, the Lamb of God who takes away the sin of the world (for those who accept him, but not for those who reject him.)

Doctor Jesus has ordained me to be a Priest and a messenger.  I have a message for you from Jesus.  If a you’re a Christian, then not only does salvation belong to you, but healing from God also belongs to you, and I’ll give you scriptures to support that statement.

There was a couple in England living in poverty.  They had been servants to a wealthy family and then had retired and were living in poverty.  The wealthy family had given them a certificate, and they framed it and hung it on the wall.

Because they hadn’t learned to read, they didn’t exactly know what the certificate said, but they knew it was something about their years of service being appreciated by the wealthy family.

A clergyman came along and visited them at their dwelling place.  He noticed the certificate on the wall and asked about it.  They told him the wealthy family had given it to them.

The clergyman went closer and found it was a check for a large amount of money that they could take to the bank and collect the money!

That couple living in poverty didn’t know what belonged to them!  There are Christians living with disease and sickness that don’t know that healing from God belongs to them!  If you don’t know what belongs to you, you’re likely never to have it, simply for lack of knowledge.  In Hosea 4:6, God says, “My people are destroyed for lack of knowledge.”  Don’t be one of those people!

There is the Old Covenant, and there is the New Covenant.  The Old Covenant is in the Old Testament part of the Holy Bible.  The New Covenant is in the New Testament.

Under both Old and New Covenants, we are promised healing from God.  Some might say, “Then why are so many Christians sick?”  Because they don’t know what is theirs, or because they don’t know how to appropriate for themselves what belongs to them.  (Or, in a few cases, maybe that Christian has backslidden, and is living in sin, in which case they should ask God to forgive them, turn right, and go straight.  First John 1:9)

When you get born-again, you get it by faith.  You hear the Gospel message, you believe it, you say Yes to God.  You get salvation by faith.  And that’s how you get healing, too.  You hear that healing belongs to you.  You believe God’s promises for healing, and you receive.

Look at Mark 11:24, where Jesus said, “When you pray, believe that you receive the things you ask for, and you shall have them.”

That word believe is a verb.  It’s something you choose to do.  But what tense of the verb is believe?  It’s present tense.  You do it now.  What tense is shall have?  It’s future tense.  If you’ll choose to believe, and keep on believing, then you shall have.  But if you don’t believe, then the shall have doesn’t come because you didn’t believe.

Believing comes when you choose to believe.  Say out loud with your mouth, “I choose to believe God’s word, the Bible.”

Right next door to Mark 11:24 is Mark 11:23, where Jesus said you can move mountains.  How do we move mountains?  By commanding them to go, and believing that what we say will happen, and not doubting in our hearts, Jesus said.

Remember how I said earlier that Jesus has never lost a patient if they’ll co-operate with him and follow instructions?  Obey Mark 11:23.

Jesus said you can move a mountain.  If you have cancer, that’s your mountain, command it to go, in Jesus’ name.  Say out loud with your mouth, “Cancer, I command you to go, in Jesus’ name.  I bind all evil spirits connected with that, and I command you to go, and never return, in Jesus’ name.”  Stay in faith and believe that what you say will happen.

There has been some teaching that once you do that, you don’t say it again, but I’ve heard teaching by Smith Wigglesworth and by Norvel Hayes that it may be appropriate at a later time to speak similar words again.  I don’t think God will be angry with you, either way you do it.

In Exodus 15:26, we read “I am the Lord who heals you.”  In Psalm 103, “Who forgives all your sins, who heals all your diseases.”

In 1 Peter 2:24, “by whose stripes you were healed.”  The stripes were the result of the Roman soldiers whipping Jesus.  That paid for our healing.  But if we don’t accept that, then, as far as we are concerned, Jesus took a whipping for nothing.

No, I say,  “Thank you Jesus, that you took that whipping for me, and so, I’m healed of everything I could have used healing for.”

In Romans 8:2, “For the law of the spirit of life in Christ Jesus has made me free from the law of sin and death.”  Sickness and disease proceed from sin.  Romans 8:2 undoes that process.

“Jesus took our infirmities and bore our sicknesses.” (Matt. 8:17)

Deuteronomy chapter 28 lists diseases that would come from sin.  Deuteronomy is part of the laws of Moses.  But in Galatians 3:13,14, “Christ has redeemed us from the curse of the law, being made a curse for us, for it is written, cursed is everyone that hangs on a tree, so the blessing of Abraham would come on the Gentiles.”

Do you see that as a Christian, healing belongs to you?  Now take it for yourself by speaking faith-filled words, and by staying in faith.  It might take a little practice.  It might take some Bible study.  Look up these scriptures for yourself.  Find other similar scriptures using a concordance.

But when dealing with demons, it’s best to have the Baptism with the Holy Ghost.

The Lord bless you.

The Bump on the Back

by Fred Hoehn, www.FredHoehnMinistries.com

Several years ago, a medical problem came my way, a bump on the back.  It was uncomfortable.  I would notice when sitting in a straight backed chair.  I would feel it when soaping my back during a shower.  I wanted it gone.

Now my Dad had had a bump on his back, and he went and had it surgically removed, but I didn't want to do that.

Following the teachings of people like Rev. Kenneth E. Hagin, Dr. Norvel Hayes, and Charles Capps, I commanded the bump to go, in Jesus' name.  But the bump didn't go right away.

I would notice it again, and command it to go again.  I probably commanded that bump to go scores of times.

The commanding of something to go is based on Mark 11:23, where Jesus said you can move mountains.

Mark 11:23 says, "For truly I say to you, that whoever shall say to this mountain, be removed, and be thrown into the sea, and doesn't doubt in his heart, but believes that the things that he says shall happen, he shall have whatever he says."

Who is talking in Mark 11:23?  Jesus, and Jesus can't lie.  Jesus says you can move a mountain.  Of course, Jesus is talking to his disciples here.  But even though I had not yet been born when Jesus spoke those words, I'm a disciple (or, follower) of Jesus.

I don't expect Mark 11:23 to work very well for unbelievers because it says you have to put your faith to work, and unbelievers are unaccustomed to using faith.

But for Christians, you command the mountain to go, you believe what you say will happen, and you don't doubt in your heart.

I'm not sure how many times I commanded the bump to go, but guess what?  The bump went away, and has been gone for years.

Mark 11:23 says you can move the mountain.  Dr. Norvel Hayes says, "Whatever you problem is, that's your mountain, command it to go."  That's good advice from that teacher man.

You can get materials from those three teachers at www.Rhema.org, and from www.nhm.cc, and from www.CharlesCapps.com

Obesity Cured

by Fred Hoehn, www.FredHoehnMinistries.com

Obesity is a very serious health problem in the world, and especially in the United States, where there is abundance of food.

In some nations where there’s a shortage of food, it’s not as serious a problem.  Probably in North Korea, for example, where I understand people are starving to death.

I met a man who had been working, and then lost his job.  While he was between jobs, he sat around watching TV and snacking.  Think he said he gained 65 pounds during that time.  Some people would be thinner if they simply watched less TV.

Another man, who was a Christian, started confessing out lout with his mouth, “I always eat and drink moderately.  I use wisdom in what I eat.”  It helped him to lose weight.  Why does this work?

Because we humans are made in the image of God.  The God who spoke the worlds into existence.  So, we also have some power to speak things into existence.

What you say with your mouth matters, so it’s good to pray the prayer that David prayed in the Psalms, “Set a watch, O Lord, before my mouth, keep the door of my lips.” (Psa. 141:3)

Another factor in having weight proportional to height is what kinds of foods we eat.  I like pizza, but had to stop eating so much of it because bad for the waist line.  One weight loss counselor advised her clients to stuff themselves with vegetables while they were trying to weigh less.

Perhaps you’re asking, “What do demons have to do with obesity?”

There are demons of gluttony, just as there are demons of drug addiction, alcohol addiction, sex addiction, pornography addiction.  In fact, probably most obsessive/compulsive behaviors are demonic in origin.

Demons are fallen angels, who rebelled against God when Satan did.  But we don’t normally see them because they are spirit beings who have no flesh and blood bodies.  And now, they go around provoking people to behave inadvisedly, and foolishly, and insanely.

Most normal people like good food, but if when you get home, you have to eat everything that’s not nailed down, then probably there’s a demon (or, more than one) that needs to be cast out.  But don’t try to do that if you’re not a Christian because unbelievers don’t have authority over demons.

But Jesus gave the Christians authority over demons in Luke 10:19, and in Mark chapter 16.

And the Apostle Paul did exorcism in the Book of Acts. (Acts 16:18)

So how does a Christian use his authority over demons?  By speaking words out of their mouths.  You command the demon to stop doing what he’s been doing against you.  You command him to go and not return, in Jesus’ name.  Just like Jesus commanded the demons to go when he was living his life on earth.  (See Matthew, Mark, Luke, and John, at fredhoehnblog.)

An authority on the subject is Kenneth E. Hagin.  His books are available at www.Rhema.org.  Another authority is Dr. Norvel Hayes, see www.nhm.cc.  Another authority was Dr. Lester Sumrall of LESEA Broadcasting.  I think they have a website.

But for best results, the obese person should accept Jesus as Savior (Romans 10:9,10) and then ask God for help to get their weight right.

“When you pray, believe that you receive the things you ask for, and you shall have them.” (Mark 11:24)  “But what if I pray and don’t believe?”  Oh, well then, you don’t receive.

Epilepsy Solved

by Fred Hoehn, www.FredHoehnMinistries.com

Dear Rhonda:

A cure has been found for epilepsy.

The cause of epilepsy is fallen angels, demons that get into people.  The demons can be cast out of the epileptic by a Christian.  Non-Christians ought not to try casting out demons, and could get seriously injured by such an ill-advised attempt.

When Satan rebelled against God, some of the angels followed him.  These are the fallen angels, the demons (or, devils).  Howard Pittman, preacher from Foxworth, MS, has revealed that demons are specialists, not general practitioners that is, the same demon that tempts someone to commit adultery is not also a demon that could cause epilepsy.

Some demons can be cast out by the Christian commanding them to go, believing the words of Jesus in Luke 10:19 that give Christians authority to do so.  But some demons do not go out except by prayer and fasting.

It is my understanding that the demon of epilepsy is this latter kind.  Seems like it was Dr. Lester Sumrall, of Lester Sumrall Evangelistic Assn., So. Bend, IN, who said that.  Dr. Sumrall is an expert on the subject of casting out demons, and the author of, “Demons, the Answer Book.”

Psychologists look for causes of mental disease.  Unfortunately, psychologists generally do not consider that many of the mental diseases are caused by demons in the patient, or if that did occur to them, would not know how to cast out the demons.  But, as I said, they first would need to be born-again Christians (John chapt 3).

Dr. Sumrall, although he has passed, his books are still available from Lester Sumrall Evangelistic Assn. in South Bend, IN, or perhaps they are now calling it LESEA Broadcasting.  I've seen older videos of Dr. Sumrall teaching recently on Direct TV, around channel 360 to 374.  Perhaps it was the TBN channel (Trinirty Broadcasting Network).

Another authority on casting out of demons is Norvel Hayes, of Cleveland, TN, on the web at www.nhm.cc

Epilepsy patients are given medications, which seem to help a little, but they don't cure the disease, they only mask the problem.  The real solution is to cast out the demons.

Sincerely,

Fred Hoehn

Anger Management

by Fred Hoehn, www.FredHoehnMinistries.com

Anger management.  You didn’t used to hear much about anger management, and then someone put those two words together and invented that phrase.

Who gave us the phrase, anger management?  Was it a Psychologist?  Perhaps it was a Freudian Psychologist.  More about that in a minute, but speaking about anger management, let me tell you about a guy I used to play chess with, Bob.

Bob and I were tenants in the same building in Los Angeles.  They had a lobby and a TV room.  When we watched TV, Bob was pretty good at solving the word puzzles on “Wheel of Fortune,” and so was I.

Bob and I would sometimes play chess.  I guess we both played at about Master level.  I had previously won a small chess tournament that we had on my ship in the Navy.

But when you would sit across the table, playing chess with Bob, he would be muttering unpleasant things about you.  That’s rather bad manners, and bad chess etiquette.  In fact, it could provoke fights.  That’s why I quit playing chess with Bob.

Bob would get angry if someone beat him at chess.  In fact, when he was playing another pretty good chess player there, after the guy won the game, Bob assaulted him physically.

I take my chess seriously, too, but if you happen to win the game, I won’t assault you.  That wouldn’t be the Christian thing to do.  But Bob wasn’t a Christian.

Later that evening, though I had stopped playing chess with him, Bob and I were talking in the Lobby.  Many of the tenants there knew that Bob had assaulted that fellow.

Bob said something about maybe taking some Anger Management classes.  So it seemed a good opportunity for me to explain to Bob that Anger Management classes would not get the job done.

I explained that those classes wouldn’t get the job done because at the classes, they would not be casting demons out of people, which is what needed to happen with Bob.

When I told Bob the problem was demons, Bob said, “That’s probably it.”  That’s the smartest thing I ever heard Bob say.

So did Bob ever go and get demons cast out of him?  Not as far as I know.  Not long afterward, I moved to a different city.

Another fellow who was given to anger was Lester Sumrall in his youth.  He would let himself get angry with people and hurt them physically.  But Sumrall got cured of it.  Sumrall also was unwilling to obey God.

Still in his youth, Sumrall came down with Tuberculosis, a severe disease that has killed many.  It was so bad for Sumrall that the doctor said he didn’t expect Sumrall to make it through that night.

That night, God gave Sumrall a vision.  What Sumrall saw in the vision was a large coffin on one side, and a large Bible on the other side.  The Lord said to Sumrall, “This night, you will choose one or the other.”  In other words, Lester Sumrall was either going to choose to be a preacher, or he was going to die.

Sumrall said, “Well, I guess I’ll be a preacher.”  It seems to me he made the right choice.

After choosing to obey God, Sumrall stopped the excessive anger.

Sumrall later did a famous casting out of demons from a woman in the Philippines, and cast demons out of other people.  Dr. Norvel Hayes learned to cast out demons from Lester Sumrall, and then Hayes went on to cast out more demons on his own.

Speaking of Psychologists, I’ve heard that among the various professions, Psychologists have one of the highest suicide rates.  I suspect that’s because they have rather low cure rates with their patients, and are quite frustrated at their lack of success with their patients.

When Psychologists study to get their degrees and credentials, I’m pretty sure that one of their textbooks is not the Holy Bible, but it certainly should be.  The Bible introduces people to the subject of demons, if people are not already aware of demons.

Demons cause mental problems like Schizophrenia, Bipolar Disorder, Kleptomania, Severe Anger, Serial Killer, Paranoia, and dozens of others.

You know, I think maybe people were smarter about two thousand years ago than people today, at least in this one area.

One time Jesus asked the question, “Why are you trying to kill me? (John 7:19)  They answered Jesus, “You have a demon, who’s trying to kill you.”

But these days, they wouldn’t say, “You have a demon,”  they would say, “You’re paranoid,” not realizing that paranoia is generally caused by a demon.

But they really were trying to kill Jesus, and with the help of Judas Iscariot, they did get Jesus crucified.

So, if you’re a Psychologist, and trying to cure mental diseases, you’re severely handicapped if you don’t know about demons, since demons are behind so many of the mental diseases.

But even if you did know about demons, you still don’t have the authority to cast them out unless you’re a Christian.  Jesus gave the Christians authority over demons in Luke 10:19 and in Mark chapter 16.

“See, I give you power…over all the power of the enemy...” (Luke 10:19)  And we know from Ephesians chapter six that our main enemy is the devil and his demons.  Rev. Kenneth E. Hagin explained that the four categories of demons are there in Ephesians chapt. 6.  “Principalities, powers, rulers of the darkness of this world, and wicked spirits in high places.”  (Eph 6:12)

But if someone wants to cast out demons, not only should they be a Christian, but also they should ask the Lord for the Baptism with the Holy Ghost with the speaking in unknown tongues (languages).

Jesus said, “You’ll receive power after the Holy Ghost has come on you.”  (Acts 1:8)

Get that extra power that you’ll have after Jesus baptizes you with the Holy Ghost.  You’ll be at a disadvantage without the Baptism with the Holy Ghost.

And how does someone know that they have received the Baptism with the Holy Ghost?  The evidence of the Baptism with the Holy Ghost is the speaking in unknown tongues (languages).

The unknown tongue is a language unknown to the person who is speaking.  I’ve written more extensively on this subject in other articles at fredhoehnblog.wordpress.com.  Please read, “The Baptism with the Holy Ghost,” by Fred Hoehn at this blog.

Freudian Psychologists are followers of Sigmund Freud.  No doubt Freud had some intellect that he used to speculate on causes of mental problems.  But I don’t think he was too bright a guy.

In talking about women, I heard that Freud said, “What do they want?  What the (bleep) do they want?”

So, evidently, Freud didn’t bother with God, nor with God’s book, the Holy Bible.

Thus, Freud was not well-read.  If Freud had been well-read, he would have been aware of the scripture where Solomon, probably the wisest man in the Old Testament, spoke these words:  “Lest thou shouldest ponder the path of life, her ways are moveable, so that thou canst not know them.” (Proverbs 5:6) (King James Version)

I don’t say that applies to all women.  There are some God-fearing women around.

Someone might say, “But Fred, if you cast out demons, why didn’t you cast them out of that chess-player, Bob?”  Here’s the thing—one doesn’t cast demons out of someone unless they’re willing to have their demons cast out.

Furthermore, a person can be endangered by having demons cast out of them.

Jesus said, “When the unclean spirit has gone out of a man, he (the demon) walks through dry places, seeking rest, and finding none.  Then he says, I will return into my house from whence I came out; and when he has come, he finds it empty, swept, and garnished.  Then he goes, and takes with himself seven other spirits more wicked than himself, and they enter in and dwell there: and the last state of that man is worse than the first. (Matt 12:43-45)

So, if Bob had wanted to have demons cast out, I would have insisted that he first accept Jesus as Lord and Savior, otherwise, Bob could have wound up worse than before.

But I never saw any interest by Bob in getting born again.  What a pity.

The most important task for every human being during their life on earth is to get themselves straight with God.

My Mother accomplished that, and went to heaven.  My Dad failed at that, and went to hell.

"It's a Compulsion."

by Fred Hoehn, www.FredHoehnMinistries.com

There is a Cable TV channel that from time to time reports on human "hoarders," or human pack rats, people who are abnormal in that they accumulate a great deal of material possessions to the extent that they have so much stuff in their residences that they can't walk through the house without climbing over piles of stuff.

It is not illegal to have a lot of possessions if they are purchased legally.  But when the cameras show that so much stuff obstructs passage through the house, that is abnormal.  There are storage places that can be rented to store goods not immediately needed for normal living.  If that’s too expensive, sell or donate some stuff.

One of the occupants of such a place explained, "It's a compulsion."  That's right, sir, you have a compulsion.  But do you know what's behind such compulsion?

Compulsive behaviors and obsessive behaviors are generally caused by demons.  Bipolar disorder, schizophrenia, obsessive-compulsive, manic-depressive, severe depression, tendency to extreme anger, and a host of physical ailments including cancer are generally demonic.

One rather good teacher on the subject is Dr. Norvel Hayes, (www.nhm.cc).  Mark 11:23 says that you can move a mountain if you command it to go, and don't doubt in your heart, but believe that what you say will happen.  Hayes says that if you have cancer, that's your mountain, command it to go.  Before you do that, make sure you're a born-again Christian as per John chapter 3.

But what if, after commanding the mountain to go, it seems to still be there?  Command it to go again, later.  Stay in faith.  Don’t ever yield to the affliction.  And don’t ever say, “I have cancer.”  It’s not your cancer; it’s the devil’s cancer.  Make him take it back, using the authority given to Christians by Jesus in Luke 10:19.

Unfortunately, those who are not Christians don’t have the authority given in Luke 10:19.

Get for yourself the Baptism with the Holy Ghost from Jesus.  The evidence of the Baptism with the Holy Ghost is the speaking in unknown tongues (languages).  That unknown tongue is a language not known to the person doing the speaking.

And what is a demon?  A demon (or, devil) is a fallen angel that rebelled against God when Satan rebelled against God.  Satan was originally Lucifer, a good angel, until he decided he wanted to be worshipped, rebelling against God.  The Bible says he was corrupted "by reason of his brightness."

Demons don't have flesh and blood bodies like humans.  They are spirit beings and exist in a different dimension, referred to as "the spirit world."  They are not normally visible to humans, however, God opened my eyes to see into the spirit world and see a demon twice in my life, as I remember, and now I'm in my sixties.

Demons are specialists, not general practitioners, that is, the demon that tempts someone to rob a bank is not the same demon that tempts people to commit adultery.

That man with the compulsion to hoard has a demon of hoarding.  He might have more than one demon in him.  It is quite abnormal to have so much stuff that you can't walk through the house without climbing over piles of stuff.

What the man needs is for some Christian to cast that demon out of him.  But for the demon to remain cast out, the man should become a Christian.  Cast out demons want to get back in, says Jesus.

Unfortunately, many Christians have not been taught about casting out of demons.  Those Christians who know something about it are more likely to be found in Pentecostal, or Full-Gospel Protestant churches.  One such denomination is supposed to be the Assemblies of God.  However, though I grew up in an Assembly of God church, I have never seen a demon cast out in any of their churches.

But to have the demon cast out of him, the man would have to be willing for that to be done for him.  People who want to keep their demons, can't have those demons cast out, as explained by an important teacher, Kenneth E. Hagin, whose books are available at www.Rhema.org.

There is also a Kenneth W. Hagin, son of the above Hagin.  The son writes books too, but I prefer the books of Kenneth E. Hagin.

Jesus said in Mark chapter 16 that believers are supposed to cast out demons.  Why then are so few Christians doing so, in view of the fact that in Luke 10:19 we Christians are given authority from Jesus to cast out demons?

It's because there is not enough good teaching in the churches about the casting out of demons.

Another authority on the subject of casting out demons is Rev. Lester Sumrall of LESEA Broadcasting.  One of his best books on the subject is "Demons, the Answer Book."  I hope it's still in print.

Another caster out of demons was Smith Wigglesworth.  There's an excellent book about him called, "Smith Wigglesworth, Apostle of Faith," by Frodsham (from Gospel Publishing House, Springfield, MO.)

Christians who are going to cast out demons are better prepared if they have received the Baptism with the Holy Ghost with the Speaking in Unknown Tongues, as explained in one of my previous blogs.  One gets that from Jesus.  When you pray, believe that you receive the things you ask for (Mark 11:24).

In a previous blog, I mentioned that God requires murderers to be executed.  That scripture is Num. 35:33.  Thus every time a convicted murderer is sentenced to life in prison, the court is going against God’s laws.  But in some cases, local law might forbid the death penalty, in which case local law is against God’s law.  Why would people think they are doing well if they make laws contrary to God’s law?

Another example is Obamacare, which is clearly unconstitutional because it tells people they have to buy health insurance, when God tells his people in the Bible that they have free health care from Him.  Thus Obamacare violates the Constitutional right to Freedom of Religion for everyone who is Christian or Jewish.  I’m aware the Supreme Court found Obamacare to be Constitutional.  Obviously they failed to consider the above argument.  And I can provide many scriptures to support this.

What's Wrong with this Picture

by Fred Hoehn, www.FredHoehnMinistries.com

03/17/12

Bill Gaither is a music man.  Gospel music.  His program has been on PBS.  He's on the GAC channel, on Time Warner Cable.  Think I've seen him on the Trinity Broadcasting Network.

In a recent Gaither TV program, Mark Lowry sang a solo, "Mary did you know?"  He sang the words, "Did you know your baby boy will give sight to the blind man.

The Bible does say that Jesus gives sight to the blind, and there are several cases recorded in the Bible where Jesus gave sight to formerly blind people.  One man was more than forty years old, and had been blind from birth, and Jesus cured his blindness so that he got his sight.

As Lowry sang the words, "Your baby boy will give sight to the blind man," he was accompanied by a pianist.  The pianist was a blind man.

What's Wrong with this Picture?

Don’t get me wrong,  that blind musician is a terrific piano player.  I like his music.  I'm not making fun of anyone.  But Lowry was singing that Jesus gives sight to the blind, and I know that Jesus does, so why is the piano player blind?

In some cases, "You don't have because you don't ask." (James 4:2)

In other cases, people are aware that forgiveness of sins, and going to heaven belongs to Christians but they are not aware that healing also belongs to Christians.  "My people are destroyed for lack of knowledge."  (Hosea 4:6)

But I don't understand Bill Gaither putting those words that Jesus heals the blind together with a blind accompanist.

Is the excuse, "Well God can heal him if God wants to."?  Wrong thing to say.  A man came to Jesus and said, "If you will, you can heal me."  Jesus answered, "I will, be healed."

Jesus wants to heal.  If someone hasn't been healed, it's not Jesus' fault.  Someone is not claiming and believing for what belongs to them from God.

The teacher, Kenneth E. Hagin, can help out here.  And Norvel Hayes.  And Charles Capps.  Their websites are:  www.Rhema.org, www.nhm.cc, and www.CharlesCapps.com

Why Obamacare is Unconstitutional

by Fred Hoehn, www.FredHoehnMinistries.com

We Americans have certain rights guaranteed to us by the Constitution of the United States and its amendments.  In this article, I am exercising two of those Constitutional Rights, The Freedom of Speech, and The Freedom of Religion.

As a Christian, it is my duty to teach others what I know, as I find opportunity to do so.  Jesus wants me to teach and preach, so I will.

Seeing the title of this article, some might say, "But Fred, don't you know that the Supreme Court has recently found Obamacare to be constitutional?"  Yes, by a 5 to 4 vote.  They erred.  There was an argument that should have been presented that apparently was not.  Something that should have been taken into consideration that was not.

My religion is not strange.  I'm a Christian.  It comes right out of the Holy Bible.  Jesus not only forgives my sins, but he also heals my diseases (Exodus 15:26).  But there are other Christians who know about Jesus the Savior from sins, who don't know about Jesus the Healer.  Mrs. Hayes was one of them, so she died of cancer because, although she loved the Lord, her church didn't know about healing from God.  "My people are destroyed for lack of knowledge."  (Hosea 4:6)

But I know that healing belongs to me from God, along with forgiveness of sins, and along with the Baptism with the Holy Ghost, with the speaking in unknown tongues.

So, since Jesus is my healer, don't be telling me I have to buy medical insurance, because if you do, you're in violation of my Constitutional Right to Freedom of Religion, Mr. Obama, and God will surely punish you.

Colin Powell was on the Charlie Rose show.  Powell said, "Obama is a Christian."  No, you're mistaken, Mr. Powell.  Obama is not a Christian.  Jesus said we'd know men by their fruit.  If Obama were a Christian, he wouldn't be trying to force me, a Christian, to go against my religion and buy health insurance, instead of trusting Jesus to meet my health needs.

On December 8, 2009, Obama gave a speech on national TV.  It was the day he announced he was sending 30,000 more military personnel to Afghanistan.  In the early part of the speech, Obama told a huge lie.  He said, "Islam is one of the world's great religions."  No it's not.  Islam sends every one of its followers to hell.  Jesus said you must be born again.  Muslims are not born again.  A great religion does not send its followers to hell.

Obama recently came out in favor of gay rights.  But God in his book says gays can't go to heaven.  (The "effeminate" in 1 Cor. 6:9,10)

So then, since God is against homosexuality, how can Obama be for homosexuality?  Easily.  Because Obama is not a Christian, and not a God-fearing man.  Obama couldn't be pushing Obamacare, lying about Islam, and in favor of homosexuality if he were a Christian.  I don't know what his religion is, but he's clearly not a Christian, and Obamacare is unconstitutional because it violates my Constitutional right to Freedom of Religion.

In Mark chapter 16, Jesus said, "These signs shall follow those who believe, in my name they'll cast out devils, they'll speak with new languages...They shall lay hands on the sick, and they'll recover.  Divine healing is mine from God under both the Old and the New Covenants, as found in the Holy Bible.

Fred Hoehn